Copyright: Copyright © Micrografx, Inc., 1994


Contents
IGES Import Translator

IGES (Initial Graphics Exchange Specification) is an industry-standard exchange file format supported by most CAD programs running on engineering workstation platforms.

Related Topics

Importing an IGES File


Importing an IGES File

To import an IGES file:

1.	Open the File menu and choose Import. The Import dialog box opens.

2.	Click the down arrow in the List Files of Type list box.

3.	Choose IGS - IGES Drawing.

4.	Change to the drive and directory you want.

5.	Highlight the name of the file you want to import.

6.	Click Import. The dialog box closes and the imported file appears in the drawing area.

Related Topics

IGES Import Translator